DROP TABLE IF EXISTS `decompositiondb`.`prime_decomp_naive`;
CREATE TABLE  `decompositiondb`.`prime_decomp_naive` (
  `n` int(10) unsigned NOT NULL DEFAULT '0',
  `primen` int(10) unsigned NOT NULL DEFAULT '0',
  `primen1` int(10) unsigned NOT NULL DEFAULT '0',
  `jump` int(10) unsigned NOT NULL DEFAULT '0',
  `weight` int(10) unsigned NOT NULL DEFAULT '0',
  `level` int(10) unsigned NOT NULL DEFAULT '0',
  `ln` int(10) unsigned NOT NULL DEFAULT '0',
  `sublevel` int(10) unsigned DEFAULT NULL,
  PRIMARY KEY (`n`)
) ENGINE=MyISAM DEFAULT CHARSET=latin1;